NA49 Pb+Pb Event-by-Event Fluctuations

Dynamical Event-by-Event Fluctuations:

< 1% in <p_T> < 15% in K/π

Single Event <p_T> (GeV)

0.3 0.4 0.5

Events

1 10 10^2

10^3

10^4

Single Event K/π Ratio

0 0.1 0.2 0.3 0.4 0.5

Events

0

500

1000

Mixed Events