Christoph Blume, Quark Matter 2001, Jan 15-20 2001

Kaons vs. System Size (cont�d)

preliminary 〈π^±〉 = (〈π^+〉 + 〈π-〉) / 2 Kpreliminary

K^+

� Scaling in R - b/2 volume / surface - ratio

R - b/2