• The number of grey protons measured with the Centrality Detector is supplemented by the NA49 TPC-s, where the grey particles are identified via dE/dx (> 2.0 units). N_{grey} = N_{CD} + N_{T P C} • Even though the number of grey particles have a steeply falling distribution in minimum bias p+Pb data, we have taken data with a broad range of centralities, using the Centrality Detector in the on-line trigger: