Christoph Blume, Quark Matter 2002, Nantes, July 18 - 24

Bose Einstein Correlations: h^-h^-

System Size Dependence (min. bias Pb+Pb)

180 MeV/c

180 MeV/c 〈k_t〉:

0.0 � 0.5

0.0 � 0.5 y*-range:

158 AGeV

40 AGeV

Energy:

NA49 preliminary

� R_{side} + R_{out}: change with centrality � R_{long}: no big change � Same at both energies

Open symbols: central data