Christoph Blume, Quark Matter 2002, Nantes, July 18 - 24

Deuteron Coalescence

B_2vs System Size

� Min. bias Pb+Pb @ 158 AGeV

� Strong variation of B_2 with centrality (almost factor 10) � Not consistent with change of HBT volume

W. Llope et al., Phys. Rev. C52 (1995) 2004

( )_3 3 2 1 4 3 G p d R m m c B hπ = 3 2 long side G R R R =

B_2 for p_t = 0 GeV/c

NA49 preliminary