Ξ yields measured by the NA49 and WA97 experiments

pp pBe pPb pPb pPb PbPb PbPb NA49 WA97 WA97 NA49 NA49 WA97 NA49 ⟨N_W ⟩ 2 2.5 4.7 4.7 6.7 350 362 ⟨ν⟩ 1 1.5 3.7 3.7 5.7 4.5 4.5 Ξ^− 0.00079 0.0015 0.003 0.004 0.0058 1.5 1.49 ±0.00006 ±0.0001 ±0.0002 ±0.0003 ±0.0004 ±0.1 ±0.18 Ξ^+ 0.00038 0.00068 0.0012 0.0014 0.0018 0.37 0.33 ±0.00004 ±0.0001 ±0.0001 ±0.0002 ±0.0002 ±0.06 ±0.05