Quark Matter 2002, Nantes Marco van Leeuwen 4

The NA49 experiment

Large acceptance spectrometer

Particle identification by dE/dx (in TPC) and TOF Magnetic field scaled with beam energy to keep TOF- detector at mid- rapidity