K+ K- inv. mass spectrum:

y-pt distribution of accepted phi’s 3

TOF result

det. acceptance event generator

simulation solid line:

after backgr.subtr.

data (330k events) near mid-rapidity small acceptance good particle id.

ϕ m=1019.1 + - .2 Γ= 9 +- 2 MeV_{2 • 10 -3}

1 phi per 100 events