NA49 Particle Identification m^2 [GeV^2]

0 0.5 1 dE/dx

0.7 0.8 0.9 1 1.1

Entries

10^2

10^3

10^4

p = 4...5 GeV/c

⇒ dE/dx Resolution: 4.5% (central Pb+Pb) ⇒ TOF Resolution: < 60 ps