Thermalization: Result

Participants

0 100 200 300 400 500

Φ_{pT} [MeV/c]

0

2

4

6 NA49 central Pb+Pb Preliminary

N+N Superposition (Fritiof)

NA49 central Pb+Pb

⇒ At present ≈ 1.5 MeV/c systematical error ⇒ Correlations in Pb+Pb are reduced