Centrality Determination for p + Pb

• measure number of slow protons (0.15 < p < 1GeV/c)

by target detector and TPC

• interpret via model calculations

mean number of projectile collisions (ν̄)

• 3 event classes

detected class slow protons ν̄ min no selection 3.7±2.5 int 2–6 4.3±2.5 cen > 7 5.7±2.5