0

1

2

3

0 1 2 3 4 5 6

NA49 preliminary

y

(dn/dy)_{PbPb}

PbPb

0 0.002

0.004

0.006

0.008

0 1 2 3 4 5 6

(dn/dy)_{pp} pp

measured reflected