Corrections, error estimates

- Geometrical acceptance - Tracking efficiency - Kaon decay - Feed-down

Λ → pπ^− Λ → pπ^+ Σ^+ → pπ^0 Σ^+ → pπ^0 K^0_S → π^+π^− small, not applied yet - Vertex resolution in case of p+p

Typical systematic error [%] π^± yield 5 K^± yield 10 p yield 5 p yield 10 Λ→p ∼3 Λ→p ∼7 N_{part} 3-15

depending on centrality