Pb+Pb EbE physics: fluctuations

Probes equilibration and thermodynamical properties of produced matter

Non-statistical event by event fluctuations (F=1):

σ < 1% in ⟨p_T⟩ σ < 4.9% in K/π at 90% confidence level