Producing Pb-Beams at Cern

ECR source P b^{27+} 2.5 KeV/u RFQ,Linac 3 250 KeV/u C stripper P b^{27+} → P b^{54+} booster+PS 4.25 GeV/u stripper P b^{54+} → P b^{82+} SPS 40-158 GeV/u

intensity ∼ 10^8 Pb-ions / SPS pulse

future ion accelerators: SPS RHIC LHC √ s_{NN} (GeV ) 17.2 200 5500 dN^{ch}/dy ∼ 400 ∼ 1200 ∼ 8000