• γ radiation from a QGP phase expected to dominate at lower p_T – no excess over hadronic backkground

• prompt γ signal for p_T > 2GeV/c probably due to pQCD hard scattering qg → qγ , qq → gγ

radiation from QGP increases rapidly with initial temperature ⇒ hope for clear signal at RHIC, LHC