source asymmetries in RQMD 2.3

average radial position (cross) and variance (vertical bar) of emission points:

pions protons

scaling with p_T below 0.5 GeV/c radial flow expected to produce scaling with v_⊥

correlation peak produced by equal velocity particles −→^{R+}_{R−} asymmetry expected for πp