expanding source model: R.Scheibl,U.Heinz:PRC59(1999) cluster spectra sensitive to shape of fireball HBT meaurements constrain only rms radii

NA49 results favor box-shape radial density profile (1)-(4) resulting parameters (4): τ_0 = 9fm/c ρ_{box} = 14fm T = 126MeV η_f = 0.28 μ/T = 1.75