Mass systematics of inverse slopes

0.1

0.2

0.3

0.4

0.5

0 0.5 1 1.5 2

Pb+Pb: NA49 preliminary Au+Au: E866 S+S: NA44ΜPRL78(97)2080Ν

π^+ h^−

K^± p ϕ Λ

Λ^−

Ξ^− d

Particle mass (GeV/c^2) m_T inverse slope (GeV)

Two comparisons: Pb+Pb vs S+S, SPS vs AGS Consistent with transverse radial flow.