Runs 442 + 443

1

10

10^2

300 320 340 360 380 400 420 440 460 480

-0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

96/03/14 10.24

(from TOFR) squared mass m^2 Μ(GeV/c^2)^2Ν

(from MTPCR) corrected specific energy loss dE/dx

π^+

K^+ p

momentum range p=4...6GeV/c^2